/* Spec Table 49 - CLOCK_ACCURACY management TLV data field */

/* to use these definitions, #define OPERATE then #include this file in your source */
OPERATE( clockAccuracy, 1, Enumeration8)
OPERATE( reserved, 1, Octet)

#undef OPERATE
