/* Spec 5.3.7 ClockQuality */

/* to use these definitions, #define OPERATE then #include this file in your source */
OPERATE( clockClass, 1, UInteger8 )
OPERATE( clockAccuracy, 1, Enumeration8 )
OPERATE( offsetScaledLogVariance, 2, UInteger16)

#undef OPERATE
